# -*- mode: mak -*-
###############################################################################
# File:         MOS68K.DEF
# Contents:     MOS68K platform defines
###############################################################################
#
#   Specify MOS_MRI toolset specific values for MOS under the MRI 68K
#   compiler
#
mri_compiler_flags  = -pCPU32 -Mcp -Md5 -KhA5 -Ml -Ku -Gf -Wa,-fNOPCR -nQ -Xp -zc -nze -v -Feo -nOj

#
